%\documentclass{article}
\documentclass[11pt]{article}
\usepackage[dvips]{graphicx}
\usepackage{amssymb,pstcol,jda,bold,boxdims,Units,pst-grad}
\addtolength{\textwidth}{2cm}
\addtolength{\textheight}{3cm}
\setlength{\oddsidemargin}{0pt}
\setlength{\evensidemargin}{0pt}
\setlength{\hoffset}{-0.5in}

\newbox\graph
\pagestyle{empty}
\thispagestyle{empty}
%
\begin{document}
  \noindent{\vspace{2ex}\input{test.tex}
  \noindent\box\graph
  }

\end{document}
